en	SSL is activated. However, your IP is allowed to enter unsecure mode for maintenance or local IP issues.
eu	SSL aktibaturik dago. Hala ere, mantenu lanengatik modu ez ziurra erabiltzea baimentzen zaio zure IP helbideari.

en	This account does not exist.
eu	Kontu hori ez da.

en	An error occurred while attempting to change your password.
eu	Errorea gertatu da pasahitza aldatzerakoan.